(a) ff^{325}_{144} spectral index map of VLSS J1431+1331. (b) Spectral index error

(c) ff^{610}_{144} �ff^{1425}_{610} spectral curvature map using LOFAR, GMRT and VLA images.

(d) Spectral curvature error