-0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 31 31.5 32 32.5 33 33.5 34 34.5 35

ϵ_ρ

Ṁ

θ_w=0 θ_w=π/6 θ_w=π/3 θ_w=π/2