0.0 0.5 1.0 1.5 2.0 2.5

8.66

8.68

8.70

8.72

8.74

8.76

8.78

8.80

8.82

-angle:

1.000 0.866 0.661 0.484 0.348 0.248

S_H

A(O)

OI,

= 777.2 nm

Best-fits: S_H = 1.631 A(O) = 8.763

WCLC spectra 3D model atmosphere

0.5 1.0 1.5 2.0 2.5

Best-fits: S_H = 1.275 A(O) = 8.743

S_H

OI,

= 777.4 nm

0.5 1.0 1.5 2.0 2.5

Best-fits: S_H = 1.564 A(O) = 8.757

S_H

1.000

4.000

16.00

64.00

256.0

1024

4096

OI,

= 777.5 nm