0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

A(O) = 8.581 A(O) = 8.592

Relative intensity + offset

A(O) = 8.604

WCLC spectra, LHD model atmosphere,

MLT = 1.0,

mic = 1.2 km/s

777.51 777.54 777.57

-0.06

-0.04

-0.02

0.00

0.02

I^{obs}-I^{calc} + offset

= 1.00

= 0.25

777.39 777.42 777.45 Wavelength, nm

777.15 777.18 777.21 777.24

-0.06

-0.04

-0.02

0.00

0.02