3 4 5 6 7 8 9

0.2 0.4 0.6 0.8 1.0

-0.08

-0.06

-0.04

-0.02

0.00

0.02

0.04

0.06

0.08

Measured EWs Theoretical EWs:

S_H=0.0 S_H=8/3

Equivalent width, pm

7772

7774

7775

Abundance difference, dex

<3D> model atmosphere

mic=1.0 km/s WCLC spectra