4000 4500 5000 5500 6000 6500 7000 7500 8000 8500 9000

0.5

1

1.5

Wavelength (A)

Flux (10 -16 ergs cm -2 s-1 A-1)

WLM 15 SDSS9 Early type galaxy template

Ca II (3968)