4000 4500 5000 5500 6000 6500 7000 7500 8000 8500 9000

0.5 1 1.5 2 2.5 3

Wavelength (A)

Flux (10 -16 ergs cm -2 s-1 A-1)

WLM 26

[O III]

(4959+5007) Hβ