4530 4540 4550 4560 4570 4580 4590 0.6

0.7

0.8

0.9

1.0

5130 5140 5150 5160 5170 5180 5190 0.6

0.7

0.8

0.9

1.0

Normalized flux

Wavelength (Angstroem)