0.6

0.5

0.4

0.3

0.2

0.1

0.0

-0.1

T_{MB} (K)

259600

259500

259400

259300

259200

259100

259000

258900 Frequency (MHz)

W3 observational spectrum Total fit HCOOCH_3 (other molecules included) HCOOCH_3 (other molecules not included)