0

10

20

Power

LS of red noise (d)

0 1000

2000

3000

(e) Integrated power of WWZ

Period(day)

Eopch(MJD-50000)

(f) WWZ of red noise

2 50 100 150 200 250 300

4700

5100

5500

5900

0 5 10 15