6 8 10 12 14 16 18 20 22

-100 0 100

X-ray sources - Stiele et al. (2011)

-300

-200

-100 0 100 200 300

-200 0 200

0 5 10 15 20 25 30 35

-100 0 100

PN - Ciardullo et al. (1989)

PA (degrees)

N

-200

-150

-100 -50 0 50 100 150 200

-200 -100 0 100 200

ΔRA (arcsec)

ΔDEC (arcsec)