20 25 30 35 40 45 50 55

-100 0 100

X-ray sources - Hofmann et al. (2013)

-300

-200

-100 0 100 200 300

-200 0 200

550 600 650 700 750 800 850 900

-100 0 100

UV sources - Rosenfield et al. (2012)

PA (degrees)

N

-100 -50 0 50 100

-100 0 100

ΔRA (arcsec)

ΔDEC (arcsec)