0 5 10 15 20 25

100 200 300 400 500 600 700 800 900 1000

R (pc)

Number of X-ray sources

36.6

36.8 37 37.2

37.4

37.6

37.8 38 38.2

38.4

38.6

100 200 300 400 500 600 700 800 900 1000

Median

Mean

R (pc)

L_X (erg s^{-1})