NGC 6946 XMM-Newton EPIC HR "ghosted" map 1-2 keV and 0.2-1 keV -0.4 -0.2 -0.0 0.2 0.4

DECLINATION (J2000)

RIGHT ASCENSION (J2000)

20 35 30 15 00 34 45 30 15

60 161412100806