7.0 7.5 8.0 8.5 9.0 9.5 10.0

10.5

11.0

6620 6640 6660 6680 6700 6720 6740 relative flux

JD − 2450000

11.0

12.0

13.0

14.0

15.0

16.0

17.0

18.0

6620 6640 6660 6680 6700 6720 6740 relative flux

JD − 2450000