-800

-400 0 400 800

-800

-400 0 400 800

-4 -2 0 2

4000

6000

8000

10000

12000

d EW / d log _{Ross} T, K

T_{eff} = 6490 K, log g = 4.0, [M/H] = 0 T_{1D LHD}

<T^4_{3D}>^{1/4}

<T^4_{3D}>^{1/4} - T_{1D}, K

T_{RMS}, K

Li I,

= 670.8 nm

3D NLTE 3D LTE

<3D> NLTE <3D> LTE

1D NLTE 1D LTE

log

Ross