0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0.16 0.18 0.2 0

20

40

60

80

100

120

α =0.001 α =0.005 α =0.01 α =0.05 α =0.1

0716+714 Lomb-Scargle normalized periodogram

f (1/day)

P(f)