0 0.05 0.1 0.15 0.2 0

10

20

30

40

50

60

70

80

90

100

α =0.001 α =0.005 α =0.01 α =0.05 α =0.1

1424+240 Lomb-Scargle normalized periodogram

f (1/day)

P(f)