0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0 2 4 6 8 10 12 14 16 18 20

α =0.001

α =0.005 α =0.01

α =0.05 α =0.1

1722+119 Lomb-Scargle normalized periodogram

f (1/day)

P(f)