0.65 0.7 0.75 0.8 0.85 0.9 0.95 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

Δ β

20 15 10 5 2

1 0.5 0.2 0.1 0.05 accuracy (color) to get C +/- 5 %, lines: C=1, C=2