0 50 100 150 41

42

43

Days since explosion log10(L[erg s -1])

R = 1071 R_{sun} R = 505 R_{sun} R = 422 R_{sun} R = 350 R_{sun} R = 177 R_{sun} R = 62 R_{sun} R = 33 R_{sun}