      C1

     A1

C2

A2

DECLINATION (J2000)

              RIGHT ASCENSION (J2000)

   11 08 51.15 51.10 51.05 51.00 50.95 50.90

06 59 03.0
      02.5
      02.0
      01.5
      01.0
      00.5
      00.0
   58 59.5