0 20 40 60 80 100 120

-19 -18.5 -18 -17.5 -17 -16.5 -16 -15.5 -15 -14.5

r/R [mag]

Rest-frame days since explosion

PTF15dtg

SN 1994I

SN 1998bw

SN 2004aw

SN 2007gr

SN 2011bm