Energy E (GeV)

1 10^210^310^410^510^610^710^810^910

]^2 GeV -1 s^{-1} sr^{-2} Intensity [cm

×^3E

-3 10 -2 10

-1 10 1 10 210 CREAM ATIC-2 CRN HEAO TRACER SNR-CRs

Magnesium