Energy E (GeV)

610^710^810^910^{10}10^{11}10

]^2 GeV -1 s^{-1} sr^{-2} Intensity [cm

×^3E

10

210

310 2≤ A ≤1 6≤ A≤3 19 ≤ A ≤7 39≤ A≤20 56 ≤ A ≤ 40 SNR-CRs EG-Minimal

WR-CRs Total