10^{−9} 10^{−7} 10^{−5} 10^{−3} 10^{−1} 10^1 E(TeV)

10^{33}

10^{34}

E L_E (erg s^{−1})

IC, Sync. No clump IC, Sync. Small clump

IC, Sync. Big clump