0 0.5 1 1.5 2 2.5 3

10^{-17}

10^{-16}

10^{-15}

10^{-14}

10^{-13}

10^{-12}

CSM radius [10_{16} cm]

CSM density [g cm -3] v^s = FWHM(H α^{broad} ) v^s = V^{P-Cyg min} (Hβ)