<!DOCTYPE html PUBLIC "-//W3C//DTD XHTML 1.0 Transitional//EN">
<html xmlns:xlink="http://www.w3.org/1999/xlink" xmlns:mml="http://www.w3.org/1998/Math/MathML">
<link rel="stylesheet" type="text/css" href="../../../CSS_FULL/edps_full.css">
<body><div id="contenu_olm">

<!-- DOI: 10.1051/0004-6361/200912100         -->

<h2 class="sec">Online Material</h2>

<p>

<p>

<h2 class="sec"><a name="SECTION000110000000000000000"></a>
Appendix A: Movie description
</h2>
  <div class="inset-old">
<table>
<tr><td><!-- init Label --><!-- end Label--><A NAME="1644"></A><A NAME="figure1490"
 HREF="img72.png"><IMG
 WIDTH="180" HEIGHT="150" SRC="Timg72.png"
 ALT="\begin{figure}
\par\includegraphics[width=16cm,keepaspectratio]{12100f12.eps}
\end{figure}"></A><!-- HTML Figure number: 12 --></td>
<td class="img-txt"><span class="bold">Figure A.1:</span><p>
Black and white snapshot of a movie showing photospheric and chromospheric images obtained during the DOT observing run on July 4, 2006 (<IMG
 WIDTH="13" HEIGHT="14" ALIGN="BOTTOM" BORDER="0"
 SRC="img1.png"
 ALT="$\sim $">07:45&nbsp;UT to 10:09&nbsp;UT). The movie (in color) is provided online as supplementary material to this paper. The DOT data are combined with the RHESSI light curves in the energy bands 3-6&nbsp;keV (white), 6-9&nbsp;keV (green) and 9-12&nbsp;keV. Data gaps are due to RHESSI night times. The three microflares presented in this work peaked at <IMG
 WIDTH="13" HEIGHT="14" ALIGN="BOTTOM" BORDER="0"
 SRC="img1.png"
 ALT="$\sim $">08:26&nbsp;UT, <IMG
 WIDTH="13" HEIGHT="14" ALIGN="BOTTOM" BORDER="0"
 SRC="img1.png"
 ALT="$\sim $">08:38&nbsp;UT and <IMG
 WIDTH="13" HEIGHT="14" ALIGN="BOTTOM" BORDER="0"
 SRC="img1.png"
 ALT="$\sim $">08:45&nbsp;UT. The vertical white dashed line sliding through the RHESSI light curve plot marks the recording time of the DOT filtergrams and dopplergrams shown in the 4 bottom panels (G&nbsp;Band, Ca&nbsp;II&nbsp;H, H<IMG
 WIDTH="11" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img2.png"
 ALT="$\alpha $">
intensities and velocities). The H<IMG
 WIDTH="11" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img2.png"
 ALT="$\alpha $">
line of sight dopplergram is scaled to [-5, +5]&nbsp;km&nbsp;s<sup>-1</sup> where upflows appear in blue and black and downflows in red and yellow. White contours in the dopplergrams enclose emission &gt;70% and 90% of the maximum intensity observed in the H<IMG
 WIDTH="11" HEIGHT="26" ALIGN="MIDDLE" BORDER="0"
 SRC="img2.png"
 ALT="$\alpha $">
line center. The frame boxes in each DOT image point out the location of enhanced chromospheric emission in the three microevents. The northern edge of the DOT images varies for the filters and for different times due to the speckle reconstruction process.</p></td>
</tr><tr><td colspan="2"><a href="http://dexter.edpsciences.org/applet.php?pdf_id=12&DOI=10.1051/0004-6361/200912100" target="DEXTER">Open with DEXTER</a></td></tr>

</table></div>
<p>
<a href="/articles/aa/full_html/2009/38/aa12100-09/movie_12100.mpg">movie_12100.mpg</a>
<br>

</div></body></html>